-0.2 -0.1 0 0.1 0.2 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

x ρ

Sod-shock Density

Computed Exact -0.2 -0.1 0 0.1 0.2 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

x

P

Sod-shock Pressure

-0.2 -0.1 0 0.1 0.2

-0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

x vx

Sod-shock Velocity