20 40 60 80 100 120 0

20

40

60

80

100

120 6.09

14.11

nr. cores/blocks

Speedup mdcore

20 40 60 80 100 120 0

0.2

0.4

0.6

0.8

1

nr. cores/blocks

Efficiency mdcore

NVidia GTX 480 AMD Opteron 8380